0 0.1 0.2 0.3 0.4 0.5 0.6

-200 0 200 400 600 800

[s]

[Nm] gravitacioni moment u 1. zglobu

0 0.1 0.2 0.3 0.4 0.5 0.6

-200 0 200 400 600 800

[s] gravitacioni moment u 2. zglobu